-5000nm/sec

      -4000

      -3000

      -2000

      -1000

          0

       1000

       2000

       3000

       4000

 5000nm/sec

HHE

-5000nm/sec

      -4000

      -3000

      -2000

      -1000

          0

       1000

       2000

       3000

       4000

 5000nm/sec

HHN

                       20:13:30 20:26:22 20:39:13 20:52:05 21:04:56 21:17:48 21:30:39

-5000nm/sec

      -4000

      -3000

      -2000

      -1000

          0

       1000

       2000

       3000

       4000

 5000nm/sec

Station AZ CPE. Event origin time: 2010-05-31 19:51:45 UTC. Filter: 6W 0.31 4 0.24 4

HHZ

P