-15000nm/sec

      -10000

       -5000

           0

        5000

       10000

 15000nm/sec

HHE

-15000nm/sec

      -10000

       -5000

           0

        5000

       10000

 15000nm/sec

HHN

                        22:57:19 23:05:53 23:14:27 23:23:02 23:31:36 23:40:10 23:48:45

-15000nm/sec

      -10000

       -5000

           0

        5000

       10000

 15000nm/sec

Station AZ PFO. Event origin time: 2013-02-25 22:53:08 UTC. Filter: False

HHZ

P